import { Link } from "react-router-dom";
import { ArrowLeft, Ban } from "lucide-react";
export default function NotFound() {
  return <div className="bg-slate-50 min-h-screen text-slate-900 flex flex-col items-center justify-center p-6 text-center">
      <div className="w-16 h-16 rounded-full bg-orange-500/10 text-orange-600 flex items-center justify-center mb-6">
        <Ban className="w-8 h-8" />
      </div>
      <h1 className="font-heading text-4xl sm:text-5xl font-extrabold tracking-tight">404 - Page Not Found</h1>
      <p className="text-sm font-light text-slate-500 max-w-md mt-4 leading-relaxed">
        The requested resource or service division URL is unavailable. Please check the address or return to our homepage.
      </p>
      <Link
    to="/"
    className="mt-8 bg-orange-500 hover:bg-orange-600 text-white font-bold text-xs px-8 py-3.5 rounded-xl uppercase tracking-wider transition-all duration-200 flex items-center gap-2 shadow-md"
  >
        <ArrowLeft className="w-4 h-4 text-white" />
        <span>Return to Homepage</span>
      </Link>
    </div>;
}
